Index: trunk/admin/install/inportal_remove.sql
===================================================================
diff -u -r3760 -r4777
--- trunk/admin/install/inportal_remove.sql	(.../inportal_remove.sql)	(revision 3760)
+++ trunk/admin/install/inportal_remove.sql	(.../inportal_remove.sql)	(revision 4777)
@@ -88,7 +88,7 @@
 # --------------------------------------------------------
 DROP TABLE Pages
 # --------------------------------------------------------
-DROP TABLE PageContent 
+DROP TABLE PageContent
 # --------------------------------------------------------
 DROP TABLE BanRules
 # --------------------------------------------------------
@@ -193,4 +193,16 @@
 DROP TABLE ProductOptions
 # --------------------------------------------------------
 DROP TABLE ProductOptionCombinations
+# --------------------------------------------------------
+DROP TABLE CategoryCustomData
+# --------------------------------------------------------
+DROP TABLE LinkCustomData
+# --------------------------------------------------------
+DROP TABLE NewsCustomData
+# --------------------------------------------------------
+DROP TABLE PortalUserCustomData
+# --------------------------------------------------------
+DROP TABLE ProductsCustomData
+# --------------------------------------------------------
+DROP TABLE TopicCustomData
 #
\ No newline at end of file
