INSERT INTO ConfigurationAdmin VALUES ('UseSmallHeader', 'la_Text_Website', 'la_config_UseSmallHeader', 'checkbox', '', '', 10.21, 0, 0);
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'UseSmallHeader', '0', 'In-Portal', 'in-portal:configure_general');

ALTER TABLE Category ADD SymLinkCategoryId INT UNSIGNED NULL DEFAULT NULL AFTER `Type`, ADD INDEX (SymLinkCategoryId);
ALTER TABLE ConfigurationValues CHANGE VariableValue VariableValue TEXT NULL DEFAULT NULL;

UPDATE Modules SET Version = '4.2.1' WHERE Name = 'Core';
UPDATE Modules SET Version = '4.2.1' WHERE Name = 'In-Portal';