ALTER TABLE Cache ADD LifeTime INT NOT NULL DEFAULT '-1';
ALTER TABLE ConfigurationAdmin CHANGE DisplayOrder DisplayOrder DOUBLE NOT NULL DEFAULT '0';
ALTER TABLE ConfigurationAdmin ADD GroupDisplayOrder DOUBLE NOT NULL AFTER DisplayOrder;
UPDATE Modules SET Version = '1.2.1' WHERE Name = 'In-Portal';